0 10 20 30 40 50 60 70 80 90 100 clt Total cloudiness % 1979/1/1 0:0:0.0 Mean 62.7115 Max 100 Min 0 January/1979

-180 -120 -60 0 60 120 -90

-70

-50

-30

-10

10

30

50

70

90