N21°24.30’

N21°25.20’

N 2 1 ° 2 6 . 1 0 ’

N 2 1 ° 2 7 . 0 0 ’

N 2 1 ° 2 7 . 9 0 ’

W 0 7 1 ° 1 0 . 5 0 ’ W 0 7 1 ° 0 9 . 6 0 ’ W 0 7 1 ° 0 8 . 7 0 ’ W 0 7 1 ° 0 7 . 8 0 ’ W 0 7 1 ° 0 6 . 9 0 ’ W 0 7 1 ° 0 6 . 0 0 ’ W 0 7 1 ° 0 5 . 1 0 ’

M B G T

2 3 2 . 0 G T

1 1 4 . 2 0 G T K

F i x 0 1

3 . 0 n m 1 1 3

2 . 0 n m

2 8 9 / 1 0 9

1 . 0 n m 2 1 3

2 . 0 n m 3 1 7